Title: Attacks and mitigations
Course: Cybersecurity Fundamentals, Kellomäki and Nivamo, 2025

Q: Which tool of Kali linux can be used to hack an SSH password?
- airmon-ng
- aireplay-ng
- aircrack-ng
- hydra
- nmap
- hping3
A: hydra

Q: All lowercase 15 character password is weaker than a 7 character password with uppercase, lowercase and numbers.
- True
- False
A: False

Q: X-mas tree attack works by (select all that apply, negative points for wrong ones):
- Floods the recipient with TCP/IP packets.
- Can set any flag in TCP packets.
- Is the same as slowhttptest
- Cannot be prevented by a firewall.
A: Floods the recipient with TCP/IP packets.; Can set any flag in TCP packets.

Q: All lowercase 15 character password is weaker than a 7 character password with uppercase, lowercase and numbers.
- False
- True
A: False