Title: On-line meeting discussion/lecture topics (TEACHERS ONLY!)
Course: Study PrepProg - Improve Your English from B1 to B2 Level > Section: Cultural communication

- lectures (real-time and video recordings)
- reading materials
- group discussion (written/spoken)
- writing assignment (short description of personal experience in terms of cultural clashes/barriers/difficulties/misunderstandings)

Assessment is focused on the student's English skills and their capability of discussing potential similarities and differences between their home culture and Finnish culture.