Title: Finnish Nurses Association: Nurses’ Collegiality Guidelines (2014)
Course: Study PrepProg Introduction Social services, Health Care and Professional English, Part 2 > Section: 6. Class: Ethics of social and health professionals

The purpose of Collegiality Guidelines is to support collegiality among nurses in their daily work.         The guidelines obligate nurses to work collegially with one another. The collegiality as nurses is an equal and reciprocal relationship between members of the profession. It supports the professional work, and aims to achieve a common objective – the best patient care possible. Collegiality influences the profession’s internal cohesion and status in society.